Erratum

Library of SM and anomalous W W γ couplings for the e^+e^− → ff̄nγ Monte Carlo programs

A. Jacholkowska, J. Kalinowski, Z. Wa̧s

Comput. Phys. Commun. 124 (2000) 238

The implementation of the anomalous coupling λ_γ in GengLib differs by the sign of λ_γ with respect to Eq.(2) of Ref. [7]. As a consequence, the code of our library, distributed together with the publication Comput. Phys. Commun.124 (2000) 233, uses different convention (opposite sign of λ_γ ) than the one generally used, in particular in Ref. [8].

We thank Alexander Oh for calling our attention to this difference.