MC-TESTER results for decays of particle τ^− (PDG code 15).

Piotr Golonka Tomasz Pierzchala Zbigniew Was

April 1, 2003

Results from generator 1.

eett6f v.1.0 e^+e^− → b b̄ μ^− ν̄_μ u d̄ 500 GeV in CMS

• Total number of analyzed decays: 37906

• Number of decay channels found: 1

Results from generator 2.

HELAC/PHEGAS total cross section 16.964(16) contact costas.papadopoulos@cern.ch

• Total number of analyzed decays: 37906

• Number of decay channels found: 1

Found decay modes:

Decay channel Branching Ratio ± Rough Errors Max. shape Generator #1 Generator #2 dif. param.

100 → ~dub~be^−μ^− ~ν_μ 100.0000 ± 0.5136% 100.0000 ± 0.5136% 0.00995

Similarity coefficients: T1=0.000000 , T2=0.995299

Contents

1 Decay Channel: 100 → ~dub~be^−μ^− ~ν_μ 4

1 Decay Channel: 100 → ~dub~be^−μ^− ~ν_μ

Number of events from generator 1: 37906 Number of events from generator 2: 37906

5

6

7

8

9

10

11

12

13

14

15

16

17

18