Minutes of the 135th Energy Calibration Meeting held on 1 August 1997

1 Status of 1997 calibration inputs

Enominal is a good estimate of the beam energy for this year. (However, a correction will be needed for shifts of the RF frequency.)

A cabling error for the k modulation has now been fixed.

A bend modulation knob has been set up and will be tested at the end of a coming fill.

There will be another polarisation MD next Tuesday. Two 16 hour slots have been requested for the next MD period.

The code for checking the logging is being recommissioned. The train current is now being logged in the measurement data base. The NMR and train current values are still being logged privately as last year.

A cross calibration of flux loop and NMRs is still needed.

2 Next Meeting

The next meeting will be on 8 August.

Pippa Wells, 11 August 1997.