Minutes of the 160th Energy Calibration Meeting held on 17 July 1998

1 Preparations for ICHEP 98 (Vancouver)

The paper draft was discussed. Pippa Wells will implement the proposed (minor) changes. Mike Hildreth gave his (10 minute) practice talk. He will implement the proposed (minor) changes. The paper and the talk will appear on the web pages in due time.

2 Next meeting

To be arranged... probably mid August 1998.

Pippa Wells, 17 July 1998