stability over 8h

Entries Mean RMS 16 .2187E-01 .1309 1.678 / 7 Constant 2.940 Mean -.7798E-02 Sigma .1213

2003/07/01 11.52

BPM2_X_POS_variationΜμmΝ 0

0.5

1

1.5

2

2.5

3

3.5

4

-0.2 -0.1 0 0.1 0.2