environmental B fields (physics optics)

location (left and right of magnet) (m) x field (mG)

earth field (less measurements, 260) earth field (more measurements, 284) earth field (hall)

-1000

-500

0

500

1000

1500

2000

-10 -8 -6 -4 -2 0 2 4 6 8 10

environmental B fields (physics optics)

location (left and right of magnet) (m) y field (mG)

earth field (less measurements, 260) earth field (more measurements, 284) earth field (Hall)

-1000

-500

0

500

1000

1500

2000

-10 -8 -6 -4 -2 0 2 4 6 8 10

environmental B fields (physics optics)

location (left and right of magnet) (m) s field (mG)

earth field (less measurements, 264) earth field (more measurements, 284) earth field (Hall)

-1000

-500

0

500

1000

1500

2000

-10 -8 -6 -4 -2 0 2 4 6 8 10