SPECTROMETER PROJECT Budget on June 18, 1998 � Figures in kCHF FY 1998 FY 1999 I T E M Estimate Estimate Estimate Estimate Dec. ’97 June ’98 �_{98} Dec. ’97 June ’98 �_{99} INSTRUM.’N 300 350 50 100 200 100 MBI Dipole 85 85 0 { - { MBI Mapping and DC 332 268 322 54 { { { MECHANICS 75 170 95 75 150 75 VACUUM 25 50 25 25 50 25 TOTALS 753 977 224 200 400 200

massimo/tex/projects/spectro/budget˙tab.tex June 18, 1998