0 100 200 300

-300 -200 -100 0 100 200 300

μ (GeV/c^2)

0 100 200 300

-300 -200 -100 0 100 200 300

μ (GeV/c^2) tanβ = 1.41

tanβ = 35

ALEPH

excluded at 95Ψ CL

M_2

M_2

(GeV/c^2)

(GeV/c^2)