0 10 20 30 40 50 60

-140 -120 -100 -80 -60 -40 -20 0

μ (GeV/c^2)

M_2 (GeV/c^2)

0 10 20 30 40 50 60

-140 -120 -100 -80 -60 -40 -20 0

M νψ = 200 GeV/c^2

P Q R