0

50

100

150

0 250 500 m_0 (GeV/c^2) m_{1/2} (GeV/c^2) μ Λ 0 tanβ = 2

0

50

100

150

0 250 500 m_0 (GeV/c^2) μ Γ 0 tanβ = 2

0

50

100

150

0 250 500 m_0 (GeV/c^2) m_{1/2} (GeV/c^2) μ Λ 0 tanβ = 10

0

50

100

150

0 250 500 m_0 (GeV/c^2) μ Γ 0 tanβ = 10

ALEPH