30 40 50 60 70 80 90

50 60 70 80 90 100 110 30 40 50 60 70 80 90

50 60 70 80 90 100 110

Λ 2 pb 1.2 0.8 0.4

ΔM Γ 40 GeV/c^2 LEP 1

Ρs = 172 GeV

kinematic limit

ALEPH

95Ψ CL upper limit

M χ (GeV/c^2)

Mχ′ (GeV/c^2)