0

20

40

60

80

0 20 40 60 80

ΔM (GeV/c^2)

Efficiency (Ψ)

0

20

40

60

80

0 0.2 0.4 0.6 0.8 1

QQ

QL

W*

l = τ l = e, μ, τ

Br(χ^+5lνχ)

ALEPH