0

20

40

0 10 20 30 40

ΔM (GeV/c^2)

Efficiency (Ψ)

0

50

100

150

Background (fb) efficiency m_0 tan β μ 1000 Ρ2 < 0 1000 Ρ2 > 0 1000 35 < 0 1000 35 > 0 75 Ρ2

Background

ALEPH