0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

45 50 55 60 65 70 75 80 85

χ_1^0 mass (GeV/c^2)

Cross Section Upper Limit (pb)

GMSB

LNZ

ALEPH