0255075100020406080M2(GeV/c )m0(GeV/c )2295% CL excludedALEPHl~LEP2l~LEP1.5cALEP1.5n~LEP1

m^2_{ℓ̃}R = m^2_0 + 0.15 m^2_{1/2} � sin^2 θ_WM^2_Z cos 2β m^2_{ℓ̃}L = m^2_0 + 0.52 m^2_{1/2} �^1_2(1 � 2 sin^2 θ_W)M^2_Z cos 2β m^2_{ν̃} = m^2_0 + 0.52 m^2_{1/2} +^1_2M^2_Z cos 2β.