RESULTS

Branching ratios (fit with total cross section) :

using 161/172/183/189/192/196/200/202/205/207 GeV results :

OSAKA luminosity used at 205/207 GeV-11 Jul 2000 (systematics from 189 GeV )

BR (W → eν) = 11.19 ± 0.30 (stat) ±0.17 (syst) % BR (W → μν) = 11.05 ± 0.28 (stat) ±0.16 (syst)% BR (W → τν) = 10.53 ± 0.36 (stat) ±0.22 (syst)% BR (W → qq) = 67.22 ± 0.42 (stat) ±0.32 (syst) %

September 11, 2000

WW Branching ratio

September 11, 2000