ID Task Name Start Finish

Last Update Mon 19.4 Mon 19.4

2 98/99 Shut Down Wed 4.11 Wed 14.4

3 Non flammable gas period Mon 16.11 Thu 1.4

4 Magnet work Mon 9.11 Thu 8.4

5 Limited cooling water Mon 7.12 Sun 24.1

6 Normal cooling water start Mon 25.1 Mon 25.1

7 Magnet warming up Tue 10.11 Fri 12.3

8 Scaffolding full height Mon 14.12 Mon 1.3

9 Recable rack ITC c3 Mon 4.1 Mon 18.1

10 Uncable ITC for laser Mon 11.1 Mon 11.1

11 Laser Work Mon 11.1 Sun 31.1

12 Reinstall VDET + tests + recable Mon 18.1 Fri 5.2

13 Control Beam pipe position Fri 5.2 Fri 5.2

14 HCAL work Mon 1.2 Fri 19.2

15 Ecal tests Mon 15.2 Fri 19.2

16 Reinstall SAMBA + tests Mon 22.2 Sun 28.2

17 Reinstall Shields + casseroles Mon 1.3 Thu 4.3

18 Scaffolding half height Tue 2.3 Tue 30.3

19 Control Beam pipe position Thu 4.3 Thu 4.3

20 Moving END CAPS Fri 5.3 Fri 5.3

21 OPEN DAY Sat 6.3 Sat 6.3

22 Laser tests Mon 8.3 Wed 10.3

23 VDET tests Thu 11.3 Fri 12.3

24 Cooling down magnet Mon 15.3 Fri 26.3

25 Securiton and Gas tests Mon 15.3 Fri 19.3

26 Reinstall LCAL Mon 15.3 Tue 16.3

27 LCAL test gas tightness Wed 17.3 Wed 17.3

28 Reinstall SICAL Mon 22.3 Tue 23.3

29 Survey LCAL SICAL Mon 22.3 Tue 23.3

30 Recable LCAL + tests Wed 24.3 Fri 26.3

31 Recable SICAL + tests Wed 24.3 Fri 26.3

32 Tests LEP until setup LEP Wed 24.3 Thu 15.4

33 Vacuum Beam pipe pumping down Fri 26.3 Wed 31.3

34 Alarm level 3 tests Fri 26.3 Fri 26.3

35 Dismount scaffolding Thu 1.4 Thu 1.4

36 Closing END CAPS Thu 1.4 Thu 1.4

37 Easter Fri 2.4 Mon 5.4

38 Magnet tests Tue 6.4 Fri 9.4

39 Reinstall BCAL and survey & tests Tue 6.4 Thu 15.4

40 Test out ALEPH Tue 6.4 Sun 2.5

41 Flammable gas start Tue 6.4 Tue 6.4

42 Shifts start Tue 6.4 Tue 6.4

43 Cooling down quadrupole Tue 6.4 Fri 9.4

44 LEP closing Fri 16.4 Fri 16.4

45 LEP setting up Mon 3.5 Mon 3.5

19.4

25.1

2 9 16 23 30 7 14 21 28 4 11 18 25 1 8 15 22 1 8 15 22 29 5 12 19 26

November December January February March April

ALEPH Shut down 1998 /1999

Page 1 bernard.chadaj@cern.ch