DELPHI Preliminary

0 1 2 3 4 5 6 7 8 9 10

0 25 50 75 100 125 150 175 200 225 250

Entries Mean RMS 128 103.1 74.26

0 5 10 15 20 25 30 35

0 25 50 75 100 125 150 175 200 225 250

Entries Mean RMS 128 165.9 67.80

DELPHI Preliminary

0

50

100

150

200

250

0 250 500 750 1000 1250 1500 1750 2000 2250 2500

DELPHI Preliminary

0

50

100

150

200

250

400 500 600 700 800 900 1000 1100 1200 1300

DELPHI Preliminary

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 25 50 75 100 125 150 175 200 225 250

Entries Mean RMS 128 159.1 69.41

0 5 10 15 20 25 30

0 25 50 75 100 125 150 175 200 225 250

Entries Mean RMS 128 170.9 60.35

DELPHI Preliminary

0 25 50 75 100 125 150 175 200 225 250

500 600 700 800 900 1000 1100 1200

Strips

Anodes

Time, ns

Mean amplitude

DELPHI Preliminary

0

50

100

150

200

250

500 600 700 800 900 1000 1100 1200

Time, ns

Strip amplitude

DELPHI Preliminary

0

50

100

150

200

250

500 600 700 800 900 1000 1100 1200

Time, ns

Anode amplitude