L3

m_{inv} ΜGeVΝ

Number of Events / 1 GeV

2000 Data qqeν M.C. reweighted M.C. background (a) preliminary

M_W = 80.58

Α 0.19 GeV

0

20

40

60

80

60 70 80 90 100