cut

E_{perpendicular}/E_{tot}

Number of Events / 0.05

205 - 208 GeV preliminary L3 lνlν data M.C. signal M.C. background

0 5 10 15 20 25 30 35 40

0 0.2 0.4 0.6 0.8 1