Ρs (GeV) e^+e^- 5 e^+e^- L3

preliminary

Data SM M_s=0.75 TeV, λ=+1 M_s=0.75 TeV, λ=-1

Cross Section (nb)

0.01

0.02

0.03

0.04

0.05

0.06

0.07

120 140 160 180 200