10^{-3}

10^{-2}

10^{-1}

190 200 210 Ρs (GeV)

Cross section (pb)

m_t = 175 GeV, T_{RR} = 1 m_t = 175 GeV, S_{RR} = 1 m_t = 175 GeV, V_{ij} = 1 m_t = 170 GeV, T_{RR} = 1 m_t = 180 GeV, T_{RR} = 1

(a)