0

0.5

1

1.5

2

190 200 210 Ρs (GeV)

Cross section (pb)

m_t = 175 GeV, QCD+ISR corrected m_t = 175 GeV, Born-level m_t = 170 GeV, Born-level m_t = 180 GeV, Born-level

(b)