0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6

PRELIMINARY

κ_γ κ_Z

Excluded

L3 (a) CDF L3: m_t = 170 GeV L3: m_t = 175 GeV L3: m_t = 180 GeV