0 0.1 0.2 0.3 0.4 0.5

0 0.01 0.02 0.03 0.04 0.05

PRELIMINARY

BR(t5cγ) + BR(t5uγ)

BR(t5cZ) + BR(t5uZ)

Excluded

L3 (b) CDF L3: m_t = 170 GeV L3: m_t = 175 GeV L3: m_t = 180 GeV