1

10

10^2

10^3

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

〈dσ/dcosθ〉 (pb)

〈√s〉 = 198 GeV

0.9 0.925

0.95

0.975 1 1.025

1.05

1.075 1.1

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 cosθ

Measurement / Prediction