1

10

10^2

10^3

130 140 150 160 170 180 190 m_H ΜGeVΝ σ(e^+e^-5Hγ) Br(H5WW) ΜfbΝ

L3 preliminary

Excluded Region

<Ρs> = 198 GeV

d = 1.0 d =-1.0 Δg_1^Z = 1.0 Δg_1^Z =-1.0