5 10 15 20 25 30 35 40

160 170 180 190 200 210 220

√s (GeV) σ_{Zγ} (pb)

L3 Preliminary SM Data

-20

0

20

160 170 180 190 200 210 220

√s (GeV)

Δ σ (%)