L3 preliminary

0 200 400 600 800

1 2 3

M(γγ) (GeV)

Events/15MeV

0 200 400 600 800

0.5 1 1.5 2 2.5

M(π^+π^−) (GeV)

Events/25MeV

0

500

1000

1500

0.5 1 1.5 2 2.5

M(π^0π^{+−}) (GeV)

Entries/25MeV

0 250 500 750 1000

-1 -0.5 0 0.5 1

CosΘ(π^{+−})

Entries/0.06 rad

0 100 200 300 400

-1 -0.5 0 0.5 1

CosΘ(π^0)

Events/0.04 rad

0

200

400

-1 -0.5 0 0.5 1

CosΘ(π^+π^−)

Events/0.06 rad