[GeV] gen M 90.7 90.8 90.9 91 91.1 91.2 91.3 91.4 91.5 91.6 91.7

[GeV] fitM

90.7

90.8

90.9 91 91.1

91.2

91.3

91.4

91.5

91.6

91.7

Likelihood 0.00014 ± Slope: 0.99974

L3 preliminary