Standard Model 68% C.L., 2-par fit 95% C.L., 2-par fit 68% C.L., 3-par fit proj

Δg_1^z λ_γ

L3_{preliminary}

-0.2

0

0.2

0.4

0.6

-0.4 -0.2 0 0.2 0.4