p_{max}/E_{beam}

Number of events / 0.05

Data 200 GeV μ^+μ^−(γ) e^+e^−μ^+μ^− W^+W^− others L3 preliminary

1

10

10^2

10^3

0 0.25 0.5 0.75 1 1.25 1.5