Recoil Mass (GeV)

Events/5 GeV

L3 Preliminary a)

√s=189 GeV

Data

Standard Model a_0/Λ^2=0.08 GeV^{−2}

0

2

4

6

8

10

12

20 40 60 80 100 120 140 160 180