k_γ k_Z

Excluded

Excluded

L3 preliminary

CDF m_{top} = 180 GeV/c^2 m_{top} = 175 GeV/c^2 m_{top} = 170 GeV/c^2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1