√s = 189-202 GeV b) me^ψ_{L,R} Λ mχ^{ψ0}_1 me^ψ_{L,R} (GeV) mχ^{ψ0}_1 (GeV)

L3 Preliminary

0

50

100

150

0 100 200 300

CDF

Excluded by L3 at 95% C.L.

χ^0_1 is pure Bino ψ