0

50

100

150

0 100 200 300

m_0 (GeV)

M_2 (GeV)

λ λ″ λ′

L3 prel.

189 GeV

Excluded at 95 Ψ C.L.

tanβ = 2 75 80 85

100

M = 200 GeV e_Rψ