λ″ 192-202 GeV upper limits

0 0.2 0.4 0.6

20 30 40 50 60 70 80 90 100 M χ^0_1 (GeV) σ(χ^0_1 χ^0_1) pb

0.2 0.3

0 10 20 30 40 50 60 70 ΔM = M χ^Α_1 - M χ^0_1 (GeV) σ(χ^+_1 χ^−_1) pb

0

0.2

0 10 20 30 40 50 60 70 80 ΔM = M l^Α - M χ^0_1 (GeV) σ(l^+ l^-) pb e~ μ~ τ~ ψ ψ ψ ψ ψ ψ ψ

ψ

~ ψ a)

b)

c)

Excluded at 95 Ψ C.L PRELIMINARY L3

Excluded at 95 Ψ C.L PRELIMINARY M χ^Α_1 = 100 GeV ~ L3

Excluded at 95 Ψ C.L M l^Α = 90 GeV

~ PRELIMINARY L3