40 60 80

1 10

Mχ_1^0(GeV) ψ

Excluded at 95 Ψ C.L. L3 prel.

λ″ m_0 = 500 GeV m_0 = 70 GeV 192-202 GeV

80 85 90 95 100

1 10

tan β

M l^Α (GeV) ψ

λ″ m_0 = 0 GeV 192-202 GeV

Excluded at 95 Ψ C.L. L3 prel.