0

50

100

60 80 100

L3 preliminary

Excluded at 95Ψ C.L.

μ = -200 GeV tan β = Ρ2^–

e^~_R^Α 5 e^Αχ^~_1^0

Observed Average Cascade Inc.

ΔM = 0

Me^~_R (GeV)

Mχ^~_1^0 (GeV)