30 40 50 60 70 80 90 100

50 60 70 80 90 100 110 120 kinematically not allowed

LEP1 Exclusion

M (GeV)

M (GeV)

t^~_1 ν^~

L3

Λ 0.03 pb

Λ 0.05 pb

Λ 0.2 pb

Λ 1 pb kinematic limit

t^~_1 5 b τ ν^~ b)