Excluded at 95% CL L3

Standard Fermiophobic Model

m_H (GeV) σ_{206}(e^+e^-5HZ) Br(H5WW*) [pb]

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

100 102 104 106 108 110 112 114 116 118