L3 Results √ s GeV 183 161-172 130-140 91 R L dt pb�^1 52.22 21.15 12.05 79.74

ϵtrig (%) 78.6 ± 1.1 82.6 ± 1.8 83.0 ± 2.4 87.2 ± 1.0

Electrons

N_{obs} 301 118 55 210 Nexp (PYTHIA) 294 117 46 144 Π_{charm} (%) 58.5 ± 2.1 54.8 ± 2.3 59.5 ± 5.5 55.6 ± 4.8

ϵcharm (%) 0.56 ± 0.03 0.54 ± 0.03 0.49 ± 0.07 0.28 ± 0.04

Muons

N_{obs} 52 17 – 62 Nexp (PYTHIA) 42 16 – 48 Π_{charm} (%) 59.7 ± 6.0 56.8 ± 5.8 – 66.7 ± 9.6

ϵcharm (%) 0.07 ± 0.01 0.07 ± 0.01 – 0.07 ± 0.02

All quoted errors come from Monte Carlo statistics