0 0.2 0.4 0.6 0.8 1

50 60 70 80 90 m_HΑ (GeV/c^2)

Br(H^Α5τν)

Method A

0 0.2 0.4 0.6 0.8 1

50 60 70 80 90 m_HΑ (GeV/c^2)

Br(H^Α5τν)

Method B

0 0.2 0.4 0.6 0.8 1

50 60 70 80 90 m_HΑ (GeV/c^2)

Br(H^Α5τν)

Method C

0 0.2 0.4 0.6 0.8 1

50 60 70 80 90 m_HΑ (GeV/c^2)

Br(H^Α5τν)

Method D