
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{ifthen}
\usepackage{microtype}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{caption}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{hyperref}
\usepackage{hypcap}
\usepackage{cite}
\usepackage{mciteplus}

\begin{document}
  
  
  
  \resizebox{\textwidth}{!}{
  \begin{tabular}{lcccccc}
    \hline
    Source &
    \multicolumn{2}{c}{$\frac{\cal B\xspace\left( B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*\pm}\xspace  K\xspace\xspace^\mp\xspace\xspace\right)\xspace}{\cal B\xspace\left( B\xspace\xspace^0\xspace\!\rightarrow\xspace  K\xspace\xspace^{*+}\xspace \pi\xspace\xspace^-\xspace\xspace\right)\xspace}$} & 
    \multicolumn{2}{c}{$\frac{\cal B\xspace\left( B\xspace\xspace^0\xspace\!\rightarrow\xspace  K\xspace\xspace^{*\pm}\xspace  K\xspace\xspace^\mp\xspace\xspace\right)\xspace}{\cal B\xspace\left( B\xspace\xspace^0\xspace\!\rightarrow\xspace  K\xspace\xspace^{*+}\xspace \pi\xspace\xspace^-\xspace\xspace\right)\xspace}$} & 
    \multicolumn{2}{c}{$\frac{\cal B\xspace\left( B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*-}\xspace \pi\xspace\xspace^+\xspace\xspace\right)\xspace}{\cal B\xspace\left( B\xspace\xspace^0\xspace\!\rightarrow\xspace  K\xspace\xspace^{*+}\xspace \pi\xspace\xspace^-\xspace\xspace\right)\xspace}$} \\
    & long & downstream & long & downstream & long & downstream \\
    \hline
    Fit                     & $0.14$ & $0.07$ & $\phantom{<\,}0.010$ & $\phantom{<\,}0.005$ & $\phantom{<\,}0.05$ & $0.04$ \\
    S-wave interference     & $0.32$ & $0.14$ & $\phantom{<\,}0.001$ & $\phantom{<\,}0.002$ & $\phantom{<\,}0.04$ & $0.05$ \\
    Acceptance              & $0.01$ & $0.01$ & $<0.001$ & $<0.001$ & $<0.01$ & $0.01$ \\
    Selection               & $0.08$ & $0.05$ & $<0.001$ & $\phantom{<\,}0.001$ & $\phantom{<\,}0.01$ & $0.02$ \\
    Trigger                 & $0.03$ & $0.02$ & $<0.001$ & $\phantom{<\,}0.001$ & $<0.01$ & $0.01$ \\
    Particle identification & $0.04$ & $0.03$ & $<0.001$ & $\phantom{<\,}0.001$ & $\phantom{<\,}0.01$ & $0.01$ \\
    $f_{s}/f_{d} $          & $0.10$ & $0.08$ & ---      & ---                & $\phantom{<\,}0.01$ & $0.03$ \\
    \hline
    Total                   & $0.37$ & $0.19$ & $\phantom{<\,}0.011$ & $\phantom{<\,}0.006$ & $\phantom{<\,}0.06$ & $0.08$ \\
    \hline
  \end{tabular}
}
\end{document}
