
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{ifthen}
\usepackage{longtable}
\usepackage{rotating}
\usepackage{arydshln}
\usepackage{microtype}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{caption}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{bm}
\usepackage{multirow}
\usepackage{inputenc}
\usepackage{adjustbox}
\usepackage{booktabs}
\usepackage{array}
\usepackage{siunitx}
\usepackage{hyperxmp}
\usepackage{hyperref}
\usepackage{todonotes}
\usepackage{hypcap}
\usepackage{morefloats}
\usepackage{xspace}
\usepackage{upgreek}
\usepackage{cite}
\usepackage{mciteplus}

\begin{document}
    
    
    \resizebox{\textwidth}{!}{
    \begin{tabular}{clS[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]S[table-format=1.5]}
    \toprule
& {Systematic uncertainty}&{ $\delta_{S1 K\xspace\xspace^*\xspace}$ }&{ $\delta_{S2 K\xspace\xspace^*\xspace}$ }&{ $\delta_{S3 K\xspace\xspace^*\xspace}$ }&{ $\delta_{S1( K\pi\xspace)}$ }&{ $\delta_{S2( K\pi\xspace)}$ }&{ $\delta_{S3( K\pi\xspace)}$ }&{ $f^{0}_{\rho K\xspace\xspace^*\xspace}$ }&{ $f^{||}_{\rho K\xspace\xspace^*\xspace}$ }&{ $f^{\perp}_{\rho K\xspace\xspace^*\xspace}$ }&{ $f^{0}_{\omega\xspace\xspace K\xspace\xspace^*\xspace}$} & {$f^{||}_{\omega\xspace\xspace K\xspace\xspace^*\xspace}$}  \\
  \midrule   %
 \parbox[t]{3mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{ $ C\!P$ \xspace averages}}} & Centrifugal barrier factors  &  0.01  &  {$-$\phantom{.}}  &  0.01  &  0.01  &  0.001  &  0.02  &  0.001  &  0.001  &  0.002  &  {$-$\phantom{.}}  &  {$-$\phantom{.}} \\
& Hypatia parameters & {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.001  &  0.01  &  0.001  &  0.001  &  0.001  &  {$-$\phantom{.}}  &  {$-$\phantom{.}} \\
& \mbox{ $ B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*0}\xspace \kern 0.2em\overline{\kern -0.2em  K\xspace}{}\xspace{}^{*0}\xspace$ }\xspace bkg. &0.05  &  {$-$\phantom{.}}  &  0.01  &  0.02 &  0.002  &  0.01  &  0.005  &  0.003  &  0.005  &  0.02  &  0.02\\
& Simulation sample size  & 0.02  &  0.01  &  0.02  &  0.02  &  0.009  &  0.03  &  0.004  &  0.004  &  0.004  &  0.06  &  0.05\\
&Data-Simulation corrections  & {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.01  &  {$-$\phantom{.}} \\
 \midrule   %
 \parbox[t]{3mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{ $ C\!P$ \xspace asym.}}} & Centrifugal barrier factors  &0.01  &  0.001  &  0.001  &  0.004  &  0.003  &  0.02  &  {$-$\phantom{.}}  &  0.001  &  0.002  &  0.01  &  0.01\\
& Hypatia parameters &{$-$\phantom{.}}  &  0.002  &  0.002  &  0.004  &  0.001  &  0.01  &  {$-$\phantom{.}}  &  0.003  &  0.002  &  0.01  &  0.01\\
& \mbox{ $ B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*0}\xspace \kern 0.2em\overline{\kern -0.2em  K\xspace}{}\xspace{}^{*0}\xspace$ }\xspace bkg. & 0.04  &  0.005  &  0.011  &  0.023  &  0.002  &  0.01  &  0.03  &  0.007  &  0.011  &  0.03  &  0.06\\
& Simulation sample size  &0.03  &  0.022  &  0.022  &  0.025  &  0.012  &  0.03  &  0.02  &  0.010  &  0.009  &  0.12  &  0.14\\
&Data-Simulation corrections  & {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}  &  0.003  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.001  &  0.001  &  {$-$\phantom{.}}  &  0.01\\
      \midrule %
\parbox[t]{5mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{\parbox{1.5cm}{Common\\ ( $ B\xspace\xspace^0$ \xspace, $\kern 0.18em\overline{\kern -0.18em  B\xspace}{}\xspace{}^0$ \xspace)}}}}&  Mass propagators parameters  &0.19 & 0.031 & 0.070 & 0.200 & 0.018 & 0.06 & 0.011 & 0.005 & 0.006 & 0.01 & 0.01 \\
& Masses and angles resolution  &0.02 & 0.027 & 0.017 & 0.026 & 0.026 & 0.05 & 0.010 & 0.016 & 0.018 & 0.14 & 0.12 \\
& Fit method  & {$-$\phantom{.}} & 0.004 & 0.001 & 0.002 & 0.001 & {$-$\phantom{.}} & 0.003 & 0.001 & 0.002 & 0.01 & 0.05 \\
&  $a_1(1260)$ pollution  & 0.09 & 0.040 & 0.040 & 0.040 & 0.050 & 0.04 & 0.015 & 0.040 & 0.031 & 0.02 & 0.01 \\
&  Symmetrised ( $\pi\pi$ \xspace) PDF  &0.03 & 0.029 & 0.022 & 0.035 & 0.006 & 0.05 & 0.004 & {$-$\phantom{.}} & 0.004 & 0.04 & 0.05 \\
    \toprule
& {Systematic uncertainty}&{ $f^{\perp}_{\omega\xspace\xspace K\xspace\xspace^*\xspace}$ }&{  $\delta_{\rho\xspace\xspace K\xspace\xspace^*\xspace}^{||-\perp}$ }&{ $\delta_{\rho\xspace\xspace K\xspace\xspace^*\xspace}^{||-0}$ }&{ $\delta_{\rho\xspace\xspace K\xspace\xspace^*\xspace}^{\perp-0}$ }&{ $\delta_{\omega\xspace\xspace K\xspace\xspace^*\xspace}^{||-\perp}$ }&{ $\delta_{\omega\xspace\xspace K\xspace\xspace^*\xspace}^{||-0}$ }&{ $\delta_{\omega\xspace\xspace K\xspace\xspace^*\xspace}^{\perp-0}$ }&{ $\mathcal{A}_{\text{T}}^{\rho K\xspace\xspace^*\xspace,1}$ }&{ $\mathcal{A}_{\text{T}}^{\rho K\xspace\xspace^*\xspace,2}$ }&{ $\mathcal{A}_{\text{T}}^{\omega\xspace\xspace K\xspace\xspace^*\xspace,1}$ }&{ $\mathcal{A}_{\text{T}}^{\omega\xspace\xspace K\xspace\xspace^*\xspace,2}$} \\
  \midrule   %
 \parbox[t]{3mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{ $ C\!P$ \xspace averages}}} & Centrifugal barrier factors  & {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.0002  &  {$-$\phantom{.}}  &  0.001  &  0.001\\
& Hypatia parameters & {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.0002  &  {$-$\phantom{.}}  &  0.001  &  0.001\\
& \mbox{ $ B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*0}\xspace \kern 0.2em\overline{\kern -0.2em  K\xspace}{}\xspace{}^{*0}\xspace$ }\xspace bkg.  & 0.01  &  0.018  &  0.02  &  0.02  &  0.1  &  {$-$\phantom{.}}  &  0.1  &  0.0017  &  0.002  &  0.004  &  0.002\\
& Simulation sample size   &0.03  &  0.009  &  0.02  &  0.02  &  0.2  &  0.2  &  0.2  &  0.0013  &  0.002  &  0.012  &  0.012\\
&Data-Simulation corrections  & {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}  &  {$-$\phantom{.}}\\
 \midrule   %
 \parbox[t]{3mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{ $ C\!P$ \xspace asym.}}} & Centrifugal barrier factors   &{$-$\phantom{.}}  &  0.004  &  0.007  &  0.004  &  0.03  &  0.02  &  0.04  &  0.0003  &  0.001  &  0.001  &  0.001\\
& Hypatia parameters &0.1  &  0.001  &  0.002  &  0.002  &  0.02  &  0.01  &  0.02  &  0.0001  &  {$-$\phantom{.}}  &  0.001  &  0.001\\
& \mbox{ $ B\xspace\xspace^0_ s\xspace\xspace\xspace\!\rightarrow\xspace  K\xspace\xspace^{*0}\xspace \kern 0.2em\overline{\kern -0.2em  K\xspace}{}\xspace{}^{*0}\xspace$ }\xspace bkg. & 0.2  &  0.024  &  0.020  &  0.026  &  0.06  &  0.04  &  0.13  &  0.0017  &  0.004  &  0.005  &  0.003\\
& Simulation sample size   &0.1  &  0.011  &  0.027  &  0.023  &  0.14  &  0.17  &  0.20  &  0.0013  &  0.002  &  0.015  &  0.017\\
&Data-Simulation corrections  &{$-$\phantom{.}}  &  {$-$\phantom{.}}  &  0.002  &  0.002  &  0.02  &  0.01  &  0.01  &  {$-$\phantom{.}} &  {$-$\phantom{.}}  &  0.001  &  {$-$\phantom{.}}\\
      \midrule %
\parbox[t]{5mm}{\multirow{5}{*}{\rotatebox[origin=c]{90}{\parbox{1.5cm}{Common\\ ( $ B\xspace\xspace^0$ \xspace, $\kern 0.18em\overline{\kern -0.18em  B\xspace}{}\xspace{}^0$ \xspace)}}}}&  Mass propagators parameters  & {$-$\phantom{.}} &0.004 & 0.028 & 0.024 & 0.07 & 0.06 & 0.09 & 0.0006 & 0.001 & 0.002 & {$-$\phantom{.}}\\
& Masses and angles resolution  & 0.08 & 0.031 & 0.029 & 0.040 & 0.60 & 0.40 & 0.60 & 0.0020 & 0.005 & 0.026 & 0.019\\
& Fit method  & 0.03 & 0.003 & 0.005 & 0.004 & 0.02 & 0.02 & 0.03 & 0.0001 & {$-$\phantom{.}} & 0.005 & 0.001\\
&  $a_1(1260)$ pollution  & 0.01& 0.024 & 0.035 & 0.032 & 0.24 & 0.32 & 0.40 & 0.0040 & 0.004 & 0.012 & 0.001\\
&  Symmetrised ( $\pi\pi$ \xspace) PDF   &0.03 & 0.005 & 0.001 & 0.001 & 0.35 & 0.02 & 0.29 & 0.0007 & 0.001 & 0.018 & 0.003\\
\bottomrule
    \end{tabular}}
\end{document}
