Christoph Blume, Quark Matter 2002, Nantes, July 18 - 24

Bose Einstein Correlations: h^-h^-

Energy Dependence (central Pb+Pb)

Syst. error on radii < 0.5 fm

NA49 preliminary

0.0 � 0.5

0.0 � 0.5

0.0 � 0.5 y*-range: 10% 7% 7% Centrality:

158 AGeV

80 AGeV

40 AGeV

Energy:

� No significant energy dep. � R_{out} > R_{side}