
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{ifthen}
\usepackage{multirow}
\usepackage{microtype}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{hyperref}
\usepackage{hypcap}
\usepackage{cite}
\usepackage{mciteplus}

\begin{document}

\begin{tabular}{lc}
Source & Uncertainty [ps$^{-1}$] \\ \noalign{\hrule height 1pt}
$z$-scale		& 0.004 \\
Momentum scale		& 0.004\\
Decay time bias		& 0.001\\ \noalign{\hrule height 1pt}
Total systematic uncertainty   & 0.006\\  
\end{tabular}
\end{document}
