
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{ifthen}
\usepackage{overpic}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{hyperref}
\usepackage{hypcap}
\usepackage{cite}
\usepackage{mciteplus}

\begin{document}
  
  \footnotesize
    \begin{tabular}{lccccccccc}
      Source            			& $\Gamma_{ s\xspace\xspace}\xspace$ 	& $\Delta\Gamma_{ s\xspace\xspace}\xspace$	& $|A_{\perp}|^2$ 	& $|A_{0}|^2$ 	& $\delta_\parallel$ 	&$\delta_\perp$	& $\phi_s$  	& $|\lambda|$  & $\Delta m_{ s\xspace\xspace}\xspace$ 	        \\
       						& [ps$^{-1}$]	&[ps$^{-1}$]	&  		& 		&  [rad] 	&  [rad] 	& [rad] 	&	          &[ps$^{-1}$]      	\\[0.5ex] \hline
      \rule[3.5mm]{0mm}{0mm}Total stat. uncertainty   & 0.0027 	& $0.0091$ 	& $0.0049$ 	& $0.0034$ 	& $^{+0.10}_{-0.17}$
		& $^{+0.14}_{-0.15}$ 		& $0.049$ 	& 0.019          &         	$^{+0.055}_{-0.057}$\\[0.1ex]       \hline
      Mass factorisation                        & --            & 0.0007	& 0.0031 	& 0.0064	& 0.05 	& 0.05 	        & 0.002	         & 0.001   	& 0.004               \\
      Signal weights (stat.)                    & 0.0001        & 0.0001	& -- 	        & 0.0001	& --
      & --	& --	         & --   	& --               \\        
      $b$-hadron background      		& 0.0001	& 0.0004 	& 0.0004	& 0.0002 	& 0.02 	        & 0.02 		& 0.002 	& 0.003         & 0.001	\\ 
      $B_c^+$ feed-down			& 0.0005	& -- 		& -- 		& --		& --		&-- 			& --		& -- 		&	--		\\ 
      Angular resolution bias		& --	 	& -- 		& 0.0006 	& 0.0001 	& $^{+0.02}_{-0.03}$		 	& 0.01 		& -- 		& -- 	&	--		\\ 
      Ang. efficiency (reweighting)			& 0.0001 	& --            & 0.0011	& 0.0020	& 0.01 	        & --		& 0.001		& 0.005	        & 0.002            	\\ 
      Ang. efficiency (stat.) 			& 0.0001  	& 0.0002	& 0.0011	& 0.0004	& 0.02		& 0.01		& 0.004		& 0.002	        & 0.001	                \\ 
      Decay-time resolution       			& --     	& --    	& -- 		& -- 		& -- 	        & 0.01	& 0.002 	& 0.001 	& 0.005	\\ 
      Trigger efficiency (stat.)	& 0.0011 	& 0.0009 	& -- 		& -- 		& -- 		& -- 		& -- 		& --  		& --	\\ 
      Track reconstruction (simul.)			&  0.0007           & 0.0029	& 0.0005 	& 0.0006	 & $^{+0.01}_{-0.02}$ 	& 0.002 	        & 0.001	         & 0.001   	& $0.006$               \\
      Track reconstruction (stat.)			&  0.0005           & 0.0002	& -- 	& --	 & -- 	& -- 	        & --	         & --   	& 0.001               \\
      Length and momentum scales               	& 0.0002 	& -- 		& -- 		& -- 		& --	 	& -- 		& -- 		& -- 		& 0.005	\\ 
      S-P coupling factors	                & --            & --           & --            & --            & 0.01        & 0.01         & --             & 0.001       & 0.002            \\
      Fit bias 					& -- 		& -- 		& 0.0005 	& -- 		& -- 		&0.01 		& --		& 0.001 	&	--		\\ \hline
      \rule[3.5mm]{0mm}{0mm}Quadratic sum of syst.    		& 0.0015 	 & 	0.0032 	 & 	0.0036 	 & 	0.0067 	 & 	$^{+0.06}_{-0.07}$ 	 & 	0.06 	 & 	0.006 	 & 	0.007 	 & 	0.011	\\ 
      \hline
      \end{tabular}
  
  
\end{document}
