
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{setspace}
\usepackage{ifthen}
\usepackage{microtype}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{caption}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{hyperref}
\usepackage{hypcap}
\usepackage{cite}
\usepackage{mciteplus}
\usepackage{longtable}

\begin{document}
  
 
 \begin{tabular}{lccc}
 \hline
 Model     & Expected      & Observed       \\
           & upper limit  [pb]  & upper limit  [pb]   \\
 \hline
BV20 10ps mH125 &     95.3$^{+ 64.9}_{- 34.7}$ &    112.6 \\
BV25 10ps mH125 &     31.4$^{+ 21.0}_{- 11.3}$ &     22.5 \\
BV30 10ps mH125 &     13.6$^{+  9.1}_{-  4.9}$ &     10.9 \\
BV35 10ps mH125 &     7.21$^{+ 4.70}_{- 2.54}$ &     6.03 \\
BV40 10ps mH125 &     4.04$^{+ 2.66}_{- 1.43}$ &     3.07 \\
BV48 10ps mH125 &     2.12$^{+ 1.38}_{- 0.74}$ &     1.74 \\
BV55 10ps mH125 &     1.81$^{+ 1.17}_{- 0.63}$ &     1.50 \\
BV60 10ps mH125 &     2.18$^{+ 1.40}_{- 0.76}$ &     1.64 \\
\hline
 \end{tabular}
 
 
\end{document}
