
\documentclass[border=5pt,multi=true]{standalone}
\usepackage{standalone}
\usepackage{ifthen}
\usepackage{microtype}
\usepackage{lineno}
\usepackage{xspace}
\usepackage{caption}
\usepackage{graphicx}
\usepackage{color}
\usepackage{colortbl}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{amsfonts}
\usepackage{upgreek}
\usepackage{hyperxmp}
\usepackage{hyperref}
\usepackage{hypcap}
\usepackage{xspace}
\usepackage{upgreek}
\usepackage{cite}
\usepackage{mciteplus}
\usepackage{xspace}
\usepackage{upgreek}

\begin{document}
\begin{tabular}{lc}
\hline
Source                       & Value $[ {\mathrm{\,Me\kern -0.1em V\!/}c^2}\xspace]$\\
\hline
Momentum-scale calibration   & 0.22\\
Selection bias correction    & 0.14\\
Unknown  $\Xi\xspace^{++}_{ c\xspace\xspace c\xspace\xspace}$ \xspace lifetime     & 0.06\\
Mass fit model               & 0.07\\
\hline
Sum of above in quadrature            & 0.27\\
\hline
$\Lambda\xspace^+_ c\xspace\xspace\xspace$ mass uncertainty       & 0.14\\
\hline
\end{tabular}
\end{document}
